29 
2000	1360 
2400	1752 
2752	1512 
2080	1336 
2048	1496 
2417	1877 
2493	1903 
2433	1771 
2595	1803 
2545	1945 
2505	1833 
2763	1613 
2787	1571 
2949	1653 
2893	1519 
2897	1687 
2923	1653 
2099	1447 
2131	1403 
2269	1357 
2087	1449 
2115	1395 
2259	1465 
2231	1587 
2089	1515 
2101	1515 
2195	1531 
2061	1587 
2205	1561 
244.56 197.61 113.13 77.25 175.62 189.71 257.24 127.09 127.46 180.24 126.78 90.61 136.22 50.23 16.35 151.92 192.29 38.49 68.06 25.75 82.52 142.88 56.31 64.23 172.76 120.43 94.95 161.44 135.13 
197.61 159.67 91.41 62.42 141.9 153.29 207.86 102.69 102.99 145.64 102.44 73.21 110.07 40.59 13.21 122.76 155.37 31.1 54.99 20.8 66.67 115.45 45.5 51.9 139.59 97.31 76.72 130.45 109.19 
113.13 91.41 52.33 35.73 81.24 87.76 119 58.79 58.96 83.38 58.65 41.91 63.01 23.23 7.56 70.28 88.95 17.8 31.48 11.91 38.17 66.09 26.05 29.71 79.91 55.71 43.92 74.68 62.51 
77.25 62.42 35.73 24.4 55.47 59.93 81.26 40.14 40.26 56.93 40.05 28.62 43.03 15.86 5.16 47.99 60.74 12.15 21.5 8.13 26.06 45.13 17.78 20.29 54.57 38.04 29.99 50.99 42.68 
175.62 141.9 81.24 55.47 126.11 136.23 184.72 91.26 91.53 129.43 91.04 65.06 97.82 36.07 11.74 109.09 138.08 27.64 48.87 18.49 59.25 102.6 40.44 46.12 124.05 86.48 68.18 115.93 97.04 
189.71 153.29 87.76 59.93 136.23 147.17 199.55 98.59 98.87 139.82 98.35 70.29 105.67 38.96 12.68 117.85 149.17 29.86 52.8 19.97 64.01 110.84 43.68 49.82 134.01 93.42 73.65 125.23 104.83 
257.24 207.86 119 81.26 184.72 199.55 270.58 133.68 134.07 189.59 133.35 95.31 143.28 52.83 17.19 159.8 202.26 40.48 71.59 27.08 86.79 150.29 59.23 67.56 181.71 126.68 99.87 169.81 142.14 
127.09 102.69 58.79 40.14 91.26 98.59 133.68 66.05 66.24 93.67 65.88 47.09 70.79 26.1 8.49 78.95 99.93 20 35.37 13.38 42.88 74.25 29.26 33.38 89.78 62.59 49.34 83.9 70.23 
127.46 102.99 58.96 40.26 91.53 98.87 134.07 66.24 66.43 93.94 66.07 47.22 70.99 26.18 8.52 79.18 100.22 20.06 35.47 13.42 43 74.47 29.35 33.47 90.04 62.77 49.48 84.14 70.43 
180.24 145.64 83.38 56.93 129.43 139.82 189.59 93.67 93.94 132.84 93.44 66.78 100.39 37.02 12.05 111.97 141.72 28.36 50.16 18.98 60.81 105.3 41.5 47.34 127.32 88.76 69.98 118.98 99.59 
126.78 102.44 58.65 40.05 91.04 98.35 133.35 65.88 66.07 93.44 65.72 46.97 70.62 26.04 8.47 78.76 99.68 19.95 35.28 13.35 42.78 74.07 29.19 33.29 89.56 62.43 49.22 83.69 70.05 
90.61 73.21 41.91 28.62 65.06 70.29 95.31 47.09 47.22 66.78 46.97 33.57 50.47 18.61 6.05 56.29 71.24 14.26 25.21 9.54 30.57 52.94 20.86 23.79 64 44.62 35.18 59.81 50.06 
136.22 110.07 63.01 43.03 97.82 105.67 143.28 70.79 70.99 100.39 70.62 50.47 75.87 27.98 9.1 84.62 107.1 21.44 37.91 14.34 45.96 79.58 31.36 35.77 96.22 67.08 52.88 89.92 75.27 
50.23 40.59 23.23 15.86 36.07 38.96 52.83 26.1 26.18 37.02 26.04 18.61 27.98 10.31 3.35 31.2 39.49 7.9 13.98 5.28 16.95 29.34 11.56 13.19 35.48 24.73 19.5 33.16 27.75 
16.35 13.21 7.56 5.16 11.74 12.68 17.19 8.49 8.52 12.05 8.47 6.05 9.1 3.35 1.09 10.15 12.85 2.57 4.55 1.72 5.51 9.55 3.76 4.29 11.54 8.05 6.34 10.79 9.03 
151.92 122.76 70.28 47.99 109.09 117.85 159.8 78.95 79.18 111.97 78.76 56.29 84.62 31.2 10.15 94.37 119.45 23.91 42.28 15.99 51.26 88.76 34.98 39.9 107.32 74.81 58.98 100.29 83.94 
192.29 155.37 88.95 60.74 138.08 149.17 202.26 99.93 100.22 141.72 99.68 71.24 107.1 39.49 12.85 119.45 151.19 30.26 53.51 20.24 64.88 112.34 44.27 50.5 135.83 94.69 74.65 126.94 106.25 
38.49 31.1 17.8 12.15 27.64 29.86 40.48 20 20.06 28.36 19.95 14.26 21.44 7.9 2.57 23.91 30.26 6.05 10.71 4.05 12.98 22.48 8.86 10.1 27.19 18.95 14.94 25.41 21.27 
68.06 54.99 31.48 21.5 48.87 52.8 71.59 35.37 35.47 50.16 35.28 25.21 37.91 13.98 4.55 42.28 53.51 10.71 18.94 7.16 22.96 39.76 15.67 17.87 48.08 33.51 26.42 44.93 37.61 
25.75 20.8 11.91 8.13 18.49 19.97 27.08 13.38 13.42 18.98 13.35 9.54 14.34 5.28 1.72 15.99 20.24 4.05 7.16 2.71 8.68 15.04 5.93 6.76 18.19 12.68 9.99 17 14.23 
82.52 66.67 38.17 26.06 59.25 64.01 86.79 42.88 43 60.81 42.78 30.57 45.96 16.95 5.51 51.26 64.88 12.98 22.96 8.68 27.84 48.21 19 21.67 58.29 40.63 32.03 54.47 45.59 
142.88 115.45 66.09 45.13 102.6 110.84 150.29 74.25 74.47 105.3 74.07 52.94 79.58 29.34 9.55 88.76 112.34 22.48 39.76 15.04 48.21 83.48 32.9 37.52 100.93 70.36 55.47 94.32 78.95 
56.31 45.5 26.05 17.78 40.44 43.68 59.23 29.26 29.35 41.5 29.19 20.86 31.36 11.56 3.76 34.98 44.27 8.86 15.67 5.93 19 32.9 12.96 14.79 39.78 27.73 21.86 37.17 31.11 
64.23 51.9 29.71 20.29 46.12 49.82 67.56 33.38 33.47 47.34 33.29 23.79 35.77 13.19 4.29 39.9 50.5 10.1 17.87 6.76 21.67 37.52 14.79 16.86 45.37 31.63 24.93 42.4 35.49 
172.76 139.59 79.91 54.57 124.05 134.01 181.71 89.78 90.04 127.32 89.56 64 96.22 35.48 11.54 107.32 135.83 27.19 48.08 18.19 58.29 100.93 39.78 45.37 122.03 85.07 67.07 114.04 95.46 
120.43 97.31 55.71 38.04 86.48 93.42 126.68 62.59 62.77 88.76 62.43 44.62 67.08 24.73 8.05 74.81 94.69 18.95 33.51 12.68 40.63 70.36 27.73 31.63 85.07 59.31 46.75 79.5 66.55 
94.95 76.72 43.92 29.99 68.18 73.65 99.87 49.34 49.48 69.98 49.22 35.18 52.88 19.5 6.34 58.98 74.65 14.94 26.42 9.99 32.03 55.47 21.86 24.93 67.07 46.75 36.86 62.68 52.46 
161.44 130.45 74.68 50.99 115.93 125.23 169.81 83.9 84.14 118.98 83.69 59.81 89.92 33.16 10.79 100.29 126.94 25.41 44.93 17 54.47 94.32 37.17 42.4 114.04 79.5 62.68 106.57 89.2 
135.13 109.19 62.51 42.68 97.04 104.83 142.14 70.23 70.43 99.59 70.05 50.06 75.27 27.75 9.03 83.94 106.25 21.27 37.61 14.23 45.59 78.95 31.11 35.49 95.46 66.55 52.46 89.2 74.67 
