7 
3760	880 
4464	1432 
4048	1352 
4631	1485 
4543	1565 
4153	1397 
4213	1527 
138.89 250.6 41.73 190.22 126.34 57.09 154.71 
250.6 452.16 75.3 343.21 227.97 103.01 279.14 
41.73 75.3 12.53 57.15 37.96 17.15 46.48 
190.22 343.21 57.15 260.51 173.04 78.19 211.88 
126.34 227.97 37.96 173.04 114.93 51.93 140.73 
57.09 103.01 17.15 78.19 51.93 23.46 63.59 
154.71 279.14 46.48 211.88 140.73 63.59 172.33 
